<template>
    <DocPTViewer :docs="docs">
        <Chart type="bar" :data="chartData" :options="chartOptions" />
    </DocPTViewer>
</template>

<script>
import { getPTOptions } from '@/components/doc/helpers';
import EventBus from '@/layouts/AppEventBus';

export default {
    data() {
        return {
            chartData: null,
            chartOptions: null,
            docs: [
                {
                    data: getPTOptions('Chart'),
                    key: 'Chart'
                }
            ]
        };
    },
    beforeUnmount() {
        EventBus.off('dark-mode-toggle-complete', this.redrawListener);
        EventBus.off('theme-palette-change', this.redrawListener);
    },
    mounted() {
        this.chartData = this.setChartData();
        this.chartOptions = this.setChartOptions();

        this.redrawListener = () => {
            this.chartOptions = this.setChartOptions();
        };

        EventBus.on('theme-palette-change', this.redrawListener);
        EventBus.on('dark-mode-toggle-complete', this.redrawListener);
    },
    methods: {
        setChartData() {
            return {
                labels: ['Q1', 'Q2', 'Q3', 'Q4'],
                datasets: [
                    {
                        label: 'Sales',
                        data: [540, 325, 702, 620],
                        backgroundColor: ['rgba(249, 115, 22, 0.2)', 'rgba(6, 182, 212, 0.2)', 'rgb(107, 114, 128, 0.2)', 'rgba(139, 92, 246, 0.2)'],
                        borderColor: ['rgb(249, 115, 22)', 'rgb(6, 182, 212)', 'rgb(107, 114, 128)', 'rgb(139, 92, 246)'],
                        borderWidth: 1
                    }
                ]
            };
        },
        setChartOptions() {
            const documentStyle = getComputedStyle(document.documentElement);
            const textColor = documentStyle.getPropertyValue('--p-text-color');
            const textColorSecondary = documentStyle.getPropertyValue('--p-text-muted-color');
            const surfaceBorder = documentStyle.getPropertyValue('--p-content-border-color');

            return {
                plugins: {
                    legend: {
                        labels: {
                            color: textColor
                        }
                    }
                },
                scales: {
                    x: {
                        ticks: {
                            color: textColorSecondary
                        },
                        grid: {
                            color: surfaceBorder
                        }
                    },
                    y: {
                        beginAtZero: true,
                        ticks: {
                            color: textColorSecondary
                        },
                        grid: {
                            color: surfaceBorder
                        }
                    }
                }
            };
        }
    }
};
</script>
