<template>
    <DocSectionText v-bind="$attrs">
        <p class="mb-0">
            PrimeVue has WCAG 2.1 AA level compliance; each component has a dedicated accessibility section to document several aspects, including keyboard and screen reader support. Through communication channels such as GitHub or Discord, numerous
            accessibility experts worldwide continue to provide constant feedback to improve the accessibility features further. View the <NuxtLink to="/guides/accessibility">accessibility guide</NuxtLink> to learn more.
        </p>
    </DocSectionText>
</template>
