<template>
    <DocSectionText id="accessibility" label="Accessibility" v-bind="$attrs">
        <h3>Screen Reader</h3>
        <p>Paginator is placed inside a <i>nav</i> element to indicate a navigation section. All of the paginator elements can be customized using templating however the default behavious is listed below.</p>

        <p>
            First, previous, next and last page navigators elements with <i>aria-label</i> attributes referring to the <i>aria.firstPageLabel</i>, <i>aria.prevPageLabel</i>, <i>aria.nextPageLabel</i> and <i>aria.lastPageLabel</i> properties of the
            <NuxtLink to="/locale">locale</NuxtLink> API respectively.
        </p>

        <p>Page links are also button elements with an <i>aria-label</i> attribute derived from the <i>aria.pageLabel</i> of the <NuxtLink to="/locale">locale</NuxtLink> API. Current page is marked with <i>aria-current</i> set to "page" as well.</p>

        <p>Current page report uses <i>aria-live="polite"</i> to instruct screen reader about the changes to the pagination state.</p>

        <p>
            Rows per page dropdown internally uses a dropdown component, refer to the <NuxtLink to="/dropdown">dropdown</NuxtLink> documentation for accessibility details. Additionally, the dropdown uses an <i>aria-label</i> from the
            <i>aria.rowsPerPageLabel</i> property of the <NuxtLink to="/locale">locale</NuxtLink> API.
        </p>

        <p>
            Jump to page input is an <i>input</i> element with an <i>aria-label</i> that refers to the <i>aria.jumpToPageInputLabel</i> property and jump to page dropdown internally uses a dropdown component, with an <i>aria-label</i> that refers to
            the <i>aria.jumpToPageDropdownLabel</i> property of the <NuxtLink to="/locale">locale</NuxtLink> API.
        </p>

        <h3>Keyboard Support</h3>
        <div class="doc-tablewrapper">
            <table class="doc-table">
                <thead>
                    <tr>
                        <th>Key</th>
                        <th>Function</th>
                    </tr>
                </thead>
                <tbody>
                    <tr>
                        <td>
                            <i>tab</i>
                        </td>
                        <td>Moves focus through the paginator elements.</td>
                    </tr>
                    <tr>
                        <td>
                            <i>enter</i>
                        </td>
                        <td>Executes the paginator element action.</td>
                    </tr>
                    <tr>
                        <td>
                            <i>space</i>
                        </td>
                        <td>Executes the paginator element action.</td>
                    </tr>
                </tbody>
            </table>
        </div>

        <h3>Rows Per Page Dropdown Keyboard Support</h3>
        <p>Refer to the <NuxtLink to="/dropdown">dropdown</NuxtLink> documentation for more details about keyboard support.</p>
    </DocSectionText>
</template>
